405060708090Restwavelength(Å)Fluxscaled^{+constant(erg/cm2 /s/Å) HαHβ/[OI] NaI/HeI CaICaIHK}SN197cy(SNIn)197Aug24,96d(^×0.3)198Jan26,242d(×0.7)198Aug30,45d(×3.0)