40506070809010ObservedWavelength(Å)01×10-162×10-163×10-164×10-16Flux(erg/cm2/s/Å) (a)01_{Atm. abs.} (b)02468_{%Pol} (c)405060708090RestWavelength(Å)1020_{PA(deg)} (d)